\begin{frage}[1]%% Anzahl Punkte für diese Aufgabe
  Berechnen Sie die Lösungsmenge für $x$:
  
  $$\log_2\left(x - 5\right) = 4 \Longrightarrow x \approx \LoesungsRaum{\{21\}}$$

  \platzFuerBerechnungen{4}
\end{frage} 
